24 25 26 27 28

-5000

-4000

-3000

-2000

-1000 0

Potential density sigma 0 (kg/m^3)

Pressure (dbar)

N. Pacific eastern ST gyre

0 2 4 6

-5000

-4000

-3000

-2000

-1000 0

Brunt-Vaisala freq (cyc/hr)

0 5 10 15 20 25

-5000

-4000

-3000

-2000

-1000 0

Potential temperature (C)

Pressure

1460 1480 1500 1520 1540 1560

-5000

-4000

-3000

-2000

-1000 0

Sound velocity (m/sec)