120˚E

120˚E

140˚E

140˚E

160˚E

160˚E

180˚

180˚

160˚W

160˚W

140˚W

140˚W

120˚W

120˚W

100˚W

100˚W

80˚W

80˚W

80˚S 80˚S

60˚S 60˚S

40˚S 40˚S

20˚S 20˚S

0˚ 0˚

20˚N 20˚N

40˚N 40˚N

60˚N 60˚N

80˚N 80˚N

1

1

1

1

2

2

2

4

4

6

6

8

8

10

10 12

14

1416 1820 22 24 26

Annual mean nitrate 10m (Levitus)