0 100 200 300 400 0 10 20 30 40 50

Oxygen

Nitrate

WOCE Atlantic 25W A16 all data

0 100 200 300 400 0 0.5 1 1.5 2 2.5 3 3.5

Oxygen

Phosphate

0 10 20 30 40 50 0 0.5 1 1.5 2 2.5 3 3.5

Nitrate

0 100 200 300 400 0

50

100

150

200

Oxygen

Silicate