120˚E

120˚E

130˚E

130˚E

140˚E

140˚E

150˚E

150˚E

160˚E

160˚E

170˚E

170˚E

180˚

180˚

170˚W

170˚W

160˚W

160˚W

150˚W

150˚W

140˚W

140˚W

130˚W

130˚W

120˚W

120˚W

110˚W

110˚W

100˚W

100˚W

90˚W

90˚W

80˚W

80˚W

0˚ 0˚

10˚N 10˚N

20˚N 20˚N

.0007

.0013

.0018

.0023

.0028

.0033

.0038

.0043

.0048

.0053

.0058

.0063

.0068

.0073

.0079

.0083

.0089

.0094

.0099

.0104

.0109

.0114

.0119

.0124

.0129

.0134

.0139

.0144

.0149

.0154

.0159

.0164

.0169

.0174

.0179

.0184

.0189

.0194

.0199

.0204

.0209

.0214

.0221

Station locations for p04