140˚E

140˚E

150˚E

150˚E

160˚E

160˚E

170˚E

170˚E

180˚

180˚

170˚W

170˚W

160˚W

160˚W

150˚W

150˚W

140˚W

140˚W

130˚W

130˚W

120˚W

120˚W

110˚W

110˚W

100˚W

100˚W

90˚W

90˚W

80˚W

80˚W

70˚W

70˚W

60˚W

60˚W

60˚S 60˚S

50˚S 50˚S

40˚S 40˚S

30˚S 30˚S

20˚S 20˚S

10˚S 10˚S

0˚ 0˚

10˚N 10˚N

20˚N 20˚N

.10.19.29.39.49.59.69.79.87.97.107.117.127.137.147.157.167.177.187.197.207.217.226.236.246.256.266.276.286.401.411

Station locations for P21 TEW