0500

1000

1500

2000

2500

3000

3500

4000

4500

5000

5500

6000 0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000 11000 12000 13000

38

3839

39 39

40

40 40

40.5

40.5

40.5

40.6

40.6

40.6

40.7

40.7

40.7

40.8

40.8

40.8

40.9

40.9

40.9

41

41 41

41.1

41.1 41.1

41.2

41.2 41.2

41.3

41.3 41.3

41.32

41.32 41.32

41.34

41.34 41.34

41.36

41.36 41.36

41.38

41.38 41.38

41.4

41.4

41.4

41.42

41.42

41.42

41.44

41.44

41.44 41.44

41.46

41.46

41.46 41.46

41.48

41.48

41.48

41.48

41.5

41.5

41.5

41.5

41.5

41.51

41.51

41.51

41.51

41.51

41.52

41.52

41.52

41.52

41.52

41.53

41.53

41.53

41.53

41.53

41.54

41.54

41.54

41.54

41.54

41.55

41.55

41.55

41.55

41.55

41.56

41.56

41.56

41.56

41.57

41.57

41.57

41.57

41.58

41.58

41.58

41.58

41.59

41.59

41.59

41.59

41.6

41.6

41.6

41.6

41.6

41.6

41.6

Sigma3 for Scorpio_28 28S

km Lon

18318117917717517317116916716516316115915715515315114914714514314113913713513313112912712512312111911711511311110910710510310199979593918987

38.00

40.00

41.00

41.20

41.30

41.32

41.34

41.36

41.38

41.40

41.42

41.44

41.46

41.48

41.50

41.51

41.52

41.53

41.54

41.55

41.56

41.57

41.58

41.59

156 160 164 168 172 176 180 -176-172-168-164-160-156-152-148-144-140-136-132-128-124-120-116-112-108-104-100 -96 -92 -88 -84 -80 -76 -72