160˚W

160˚W

150˚W

150˚W

140˚W

140˚W

130˚W

130˚W

120˚W

120˚W

30˚N 30˚N

40˚N 40˚N

50˚N 50˚N

60˚N 60˚N

.0003 .0008 .0011

.0016

.0021

.0026

.0029

.0034

.0039

.0042

.0047

.0050

.0055

.0058

.0062

.0066

.0069

.0074

.0078

.0082

.0086

.0089

.0094

.0099

.0104

.0109

.0114

.0119

.0124

.0129

.0132

.0137

.0141

.0145.0150.0155

.0160 .0165

.0170

.0175

.0180

.0185

.0190 .0194 .0199

Station locations for p17n