140˚W

140˚W

130˚W

130˚W

120˚W

120˚W

110˚W

110˚W

100˚W

100˚W

90˚W

90˚W

80˚W

80˚W

70˚W

70˚W

60˚W

60˚W

70˚S 70˚S

60˚S 60˚S

50˚S 50˚S

40˚S 40˚S

30˚S 30˚S

20˚S 20˚S

.137.147.157.167.177.187.197.207.217.227

Station locations for P17E