31.00

31.05

31.10

31.15

31.20

31.25

31.30

31.35

31.40

31.45

31.50

31.55

31.60

31.65

31.70

31.75

31.80

31.85

31.90

31.95

32.00

32.05

32.10

32.15

32.20

32.25

32.30

32.35

32.40

32.45

32.50

32.55

32.60 0 500 1000150020002500300035004000450050005500600065007000750080008500900095001000010500110001150012000125001300013500

0.1

0.1

0.1 0.1

0.1

0.1

0.25

0.25

0.25 0.25

0.25

0.25

0.25

0.25

0.5

0.5

0.5

0.5

0.5

0.5 0.5

0.5

0.5

0.5

0.5

0.5

0.75

0.75

0.75

0.75

0.75 0.75

0.75

0.75

0.75

0.75

0.75

0.75

0.75

0.75

0.75 0.75

0.75

0.75

1

1 1 1

1

1

1 1

1

1

1

1

1

1.2

1.2

1.2

1.2

1.2

1.2 1.2

1.2

1.2

1.2

1.2

1.2

1.2 1.2

1.4

1.4

1.4

1.4

1.4 1.4

1.4

1.4

1.4

1.4

1.4

1.4

1.4

1.4

1.4

1.6 1.6 1.6

1.6

1.6 1.6

1.6

1.6 1.6

1.6

1.6

1.8

1.8

1.8

1.8

1.8 1.8

1.8 1.8

1.8

1.8

2

2

2

2

2 2

2

2 2

2

2

2.2

2.2

2.2

2.2

2.2

2.2 2.2

2.2 2.2 2.2

2.2

2.2

2.4 2.4

2.4

2.4 2.4

2.4

2.4

2.4

2.4

2.4 2.4

2.6

2.6

2.6

2.6 2.6

2.6

2.6

2.6

2.6 2.6

2.6

2.8 2.8

2.8

2.8 2.8

2.8

2.8

2.8

2.8 2.8

2.8

3

3

3

3 3

3

3

3 3

3.2

3.2

3.2

3.2 3.2

3.2

3.2

3.2 3.2

3.4

3.4

3.4 3.4 3.4

3.4

3.4

3.4

3.6

3.6

3.6

3.6 3.6 3.6 3.6

3.6

3.6

3.6

3.8

3.8

3.8

3.8 3.8 3.8 3.8

3.8

4

4

4

4

4 4 4

4

4

4.2

4.2

4.2

4.2

4.2

4.2

4.2

4.2

4.4

4.4

4.4

4.4

4.4

4.4

4.6

4.6

4.6

4.6

4.6

4.6

4.8

4.8

4.8

4.8

4.8

5

5

5

5

5.2

5.2

5.2

5.2

5.4

5.4

5.4

5.4

5.4

5.6

5.6

5.6

5.8

5.8

5.8

6

6

6

7

7

Oxymll (ml/l) for P16 150W

48433833282318138180185190195200205210215221226231236241246252262272282289294299304309314319324313223242526171828893

0.25

0.75

1.00

2.00

3.00

3.60

4.00

5.00

6.00

10.00

20.00

-60 -55 -50 -45 -40 -35 -30 -25 -20 -15 -10 -5 0 5 10 15 20 25 30 35 40 45 50 55