120˚E

120˚E

130˚E

130˚E

140˚E

140˚E

150˚E

150˚E

160˚E

160˚E

170˚E

170˚E

180˚

180˚

70˚S 70˚S

60˚S 60˚S

50˚S 50˚S

40˚S 40˚S

.8.18.28.38.48.58

Station locations for cruise P11S