120˚E

120˚E

130˚E

130˚E

140˚E

140˚E

150˚E

150˚E

0˚ 0˚

10˚N 10˚N

20˚N 20˚N

30˚N 30˚N

40˚N 40˚N

.0005

.0010

.0015

.0019

.0024

.0004

.0017 .0022 .0027

.0032

.0037

.0042

.0047 .0052

.0057

.0062

.0001 .0006 .0011 .0016

.0001 .0006

.0011

.0016 .0021 .0026

Station locations for p08