0500

1000

1500

2000

2500

3000

3500

4000

4500

5000

5500

6000

0 500 1000

3232.2

32.4

32.6

32.83333.1

33.2

33.3

33.4

33.5

33.6

33.7

33.8

33.93434.1

34.2

34.3

34.4

34.5

34.5

34.5

34.5

34.55

34.55

34.55

34.55

34.55

34.6

34.6

34.6

34.6

34.62

34.62

34.62

34.62

34.64

34.64

34.64

34.64

34.66

34.66

34.66

34.66

34.68

34.68 34.7

34.7 34.71

34.71 34.72

34.72 34.73

34.73 34.76

34.76 34.79 34.79

34.82

34.85 34.88 34.91 34.94 34.97 35

CTD salinity for P08S 130E

km Lat

252321191715131197531

32.00

33.00

33.70

34.00

34.50

34.60

34.70

34.73

35.00

36.00

37.00

2 4 6 8