0500

1000

1500

2000

2500

3000

3500

4000

4500

5000

5500 0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000

0

0

0

0 0

0

0

0

0 0

0

00

0

0

0 0

0

0

0 0 0 0

0 0

0 0 0

0

0

0 0 0 0 0.01 0.01

0.01 0.02

0.02 0.02

0.05

0.05 0.1 0.1 0.2 0.2 0.5 0.5

CFC-12 for I01 9N

km Lon

90290490690891191391591791992192392592792993193393593793994194394594794995195395595709719739759779799879909929949969981000

1002

1004

1006

1008

1010

1012

1014

0.00

0.01

0.02

0.10

1.00

5.00

52 54 56 58 60 62 64 66 68 70 72 74 767880 82 84 86 88 90 92 94 96