40˚E

40˚E

50˚E

50˚E

60˚E

60˚E

70˚E

70˚E

80˚E

80˚E

90˚E

90˚E

100˚E

100˚E

110˚E

110˚E

120˚E

120˚E

70˚S 70˚S

60˚S 60˚S

50˚S 50˚S

40˚S 40˚S

30˚S 30˚S

20˚S 20˚S

10˚S 10˚S

Station locations for cruise I03