0500

1000

1500

2000

2500

3000

3500

4000

4500

5000

5500

6000 0 500 1000 1500 2000 2500 3000 3500 4000 4500 5000 5500 6000 6500

0

0

0

0

0

0 0

0

0

0

0 0

0 0

0

0

0 0

0 0 0

0

0

0

0

0 0 0

0

0

0 0

0 0 0

0.01

0.01

0.01

0.01

0.01 0.02

0.02

0.02 0.05

0.05

0.05 0.1 0.1 0.2 0.2 0.5 0.5 1 1

CFC-12 for I03 20S

km Lon

560558556554552550548546544542540538536534532530528526524522520518516514512510508506504502500498496494492490488486484482480478476474472470468466464462460458456454452450448446444

0.00

0.01

0.02

0.10

1.00

5.00

50 52 54 56 58 60 62 64 66 68 70 72 74 76 78 80 82 84 86 88 90 92 94 96 98 100 102 104 106 108 110 112