80˚W

80˚W

70˚W

70˚W

60˚W

60˚W

50˚W

50˚W

40˚W

40˚W

30˚W

30˚W

20˚W

20˚W

10˚W

10˚W

0˚

0˚

10˚E

10˚E

20˚E

20˚E

30˚E

30˚E

40˚E

40˚E

60˚S 60˚S

50˚S 50˚S

40˚S 40˚S

30˚S 30˚S

20˚S 20˚S

10˚S 10˚S

0˚ 0˚

10˚N 10˚N

20˚N 20˚N

30˚N 30˚N

40˚N 40˚N

50˚N 50˚N

60˚N 60˚N

.244.254.264.274.319.329.339.349.359.369.6.16.26.36.46.56.66.76.86.96.106

Station locations for cruise A16