0500

1000

1500

2000

2500

3000

3500

4000

4500

5000

5500

6000 0 1000 2000 3000 4000 5000 6000 7000 8000 9000 10000 11000 12000 13000 20 20 2222 22

24

2424 24

26

26

26

2626 26

27

27

27

27

2727 27

27

27.8

27.8

27.8

27.8

27.8

27.8

27.8

27.8

27.9

27.9

27.9

27.9

27.9

27.9

27.9

27.9

282828 28

28

28

28

28

28

28

28.05

28.05

28.05

28.05

28.05

28.05

28.05

28.05

28.1

28.1

28.1

28.1

28.1

28.1

28.1

28.1

28.1

28.1

28.15

28.15

28.15

28.15

28.15

28.15

28.2

28.2

28.2

28.2

28.2

28.2

28.25

28.25

28.25

28.25

28.25

28.25

28.3

28.3

28.3

28.35

28.35

GAMMA-N for A16 25W

Depth

Station

km Lat